LIBRARY rpcrt4
EXETYPE NT
SUBSYSTEM WINDOWS
EXPORTS
_CStdStubBuffer_AddRef@4 = CStdStubBuffer_AddRef
_CStdStubBuffer_Connect@8 = CStdStubBuffer_Connect
_CStdStubBuffer_CountRefs@4 = CStdStubBuffer_CountRefs
_CStdStubBuffer_DebugServerQueryInterface@8 = CStdStubBuffer_DebugServerQueryInterface
_CStdStubBuffer_DebugServerRelease@8 = CStdStubBuffer_DebugServerRelease
_CStdStubBuffer_Disconnect@4 = CStdStubBuffer_Disconnect
_CStdStubBuffer_Invoke@12 = CStdStubBuffer_Invoke
_CStdStubBuffer_IsIIDSupported@8 = CStdStubBuffer_IsIIDSupported
_CStdStubBuffer_QueryInterface@12 = CStdStubBuffer_QueryInterface
_DceErrorInqTextA@8 = DceErrorInqTextA
_DceErrorInqTextW@8 = DceErrorInqTextW
_GlobalMutexClear@0 = GlobalMutexClear
_GlobalMutexClearExternal@0 = GlobalMutexClearExternal
_GlobalMutexRequest@0 = GlobalMutexRequest
_GlobalMutexRequestExternal@0 = GlobalMutexRequestExternal
_IUnknown_AddRef_Proxy@4 = IUnknown_AddRef_Proxy
_IUnknown_QueryInterface_Proxy@12 = IUnknown_QueryInterface_Proxy
_IUnknown_Release_Proxy@4 = IUnknown_Release_Proxy
_I_RpcAbortAsyncCall@8 = I_RpcAbortAsyncCall
_I_RpcAllocate@4 = I_RpcAllocate
_I_RpcAsyncAbortCall@8 = I_RpcAsyncAbortCall
_I_RpcAsyncSetHandle@8 = I_RpcAsyncSetHandle
_I_RpcBCacheAllocate@4 = I_RpcBCacheAllocate
_I_RpcBCacheFree@4 = I_RpcBCacheFree
_I_RpcBindingCopy@8 = I_RpcBindingCopy
_I_RpcBindingInqConnId@12 = I_RpcBindingInqConnId
_I_RpcBindingInqDynamicEndpoint@8 = I_RpcBindingInqDynamicEndpoint
_I_RpcBindingInqDynamicEndpointA@8 = I_RpcBindingInqDynamicEndpointA
_I_RpcBindingInqDynamicEndpointW@8 = I_RpcBindingInqDynamicEndpointW
_I_RpcBindingInqSecurityContext@8 = I_RpcBindingInqSecurityContext
_I_RpcBindingInqTransportType@8 = I_RpcBindingInqTransportType
_I_RpcBindingInqWireIdForSnego@8 = I_RpcBindingInqWireIdForSnego
_I_RpcBindingIsClientLocal@8 = I_RpcBindingIsClientLocal
_I_RpcBindingToStaticStringBindingW@8 = I_RpcBindingToStaticStringBindingW
_I_RpcClearMutex@4 = I_RpcClearMutex
_I_RpcConnectionInqSockBuffSize@8 = I_RpcConnectionInqSockBuffSize
_I_RpcConnectionSetSockBuffSize@8 = I_RpcConnectionSetSockBuffSize
_I_RpcDeleteMutex@4 = I_RpcDeleteMutex
_I_RpcFree@4 = I_RpcFree
_I_RpcFreeBuffer@4 = I_RpcFreeBuffer
_I_RpcFreePipeBuffer@4 = I_RpcFreePipeBuffer
_I_RpcGetAssociationContext@8 = I_RpcGetAssociationContext
_I_RpcGetBuffer@4 = I_RpcGetBuffer
_I_RpcGetBufferWithObject@8 = I_RpcGetBufferWithObject
_I_RpcGetCurrentCallHandle@0 = I_RpcGetCurrentCallHandle
_I_RpcGetExtendedError@0 = I_RpcGetExtendedError
_I_RpcGetServerContextList@4 = I_RpcGetServerContextList
_I_RpcIfInqTransferSyntaxes@16 = I_RpcIfInqTransferSyntaxes
_I_RpcLogEvent@28 = I_RpcLogEvent
_I_RpcMapWin32Status@4 = I_RpcMapWin32Status
_I_RpcMonitorAssociation@12 = I_RpcMonitorAssociation
_I_RpcNsBindingSetEntryName@12 = I_RpcNsBindingSetEntryName
_I_RpcNsBindingSetEntryNameA@12 = I_RpcNsBindingSetEntryNameA
_I_RpcNsBindingSetEntryNameW@12 = I_RpcNsBindingSetEntryNameW
_I_RpcNsInterfaceExported@12 = I_RpcNsInterfaceExported
_I_RpcNsInterfaceUnexported@12 = I_RpcNsInterfaceUnexported
_I_RpcParseSecurity@8 = I_RpcParseSecurity
_I_RpcPauseExecution@4 = I_RpcPauseExecution
_I_RpcReallocPipeBuffer@8 = I_RpcReallocPipeBuffer
_I_RpcReceive@8 = I_RpcReceive
_I_RpcRequestMutex@4 = I_RpcRequestMutex
_I_RpcSend@4 = I_RpcSend
_I_RpcSendReceive@4 = I_RpcSendReceive
_I_RpcServerAllocateIpPort@8 = I_RpcServerAllocateIpPort
_I_RpcServerInqAddressChangeFn@0 = I_RpcServerInqAddressChangeFn
_I_RpcServerInqTransportType@4 = I_RpcServerInqTransportType
_I_RpcServerRegisterForwardFunction@4 = I_RpcServerRegisterForwardFunction
_I_RpcServerSetAddressChangeFn@4 = I_RpcServerSetAddressChangeFn
_I_RpcServerUseProtseq2A@20 = I_RpcServerUseProtseq2A
_I_RpcServerUseProtseq2W@20 = I_RpcServerUseProtseq2W
_I_RpcServerUseProtseqEp2A@24 = I_RpcServerUseProtseqEp2A
_I_RpcServerUseProtseqEp2W@24 = I_RpcServerUseProtseqEp2W
_I_RpcSetAsyncHandle@8 = I_RpcSetAsyncHandle
_I_RpcSetServerContextList@8 = I_RpcSetServerContextList
_I_RpcSsDontSerializeContext@0 = I_RpcSsDontSerializeContext
_I_RpcStopMonitorAssociation@4 = I_RpcStopMonitorAssociation
_I_RpcTransConnectionAllocatePacket@8 = I_RpcTransConnectionAllocatePacket
_I_RpcTransConnectionFreePacket@8 = I_RpcTransConnectionFreePacket
_I_RpcTransConnectionReallocPacket@16 = I_RpcTransConnectionReallocPacket
_I_RpcTransDatagramAllocate2@16 = I_RpcTransDatagramAllocate2
_I_RpcTransDatagramAllocate@16 = I_RpcTransDatagramAllocate
_I_RpcTransDatagramFree@12 = I_RpcTransDatagramFree
_I_RpcTransGetAddressList@8 = I_RpcTransGetAddressList
_I_RpcTransGetThreadEvent@0 = I_RpcTransGetThreadEvent
_I_RpcTransIoCancelled@8 = I_RpcTransIoCancelled
_I_RpcTransProtectThread@0 = I_RpcTransProtectThread
_I_RpcTransServerNewConnection@4 = I_RpcTransServerNewConnection
_I_RpcTransUnprotectThread@4 = I_RpcTransUnprotectThread
_I_UuidCreate@4 = I_UuidCreate
_MIDL_wchar_strcpy@8 = MIDL_wchar_strcpy
_MIDL_wchar_strlen@4 = MIDL_wchar_strlen
_MesBufferHandleReset@24 = MesBufferHandleReset
_MesDecodeBufferHandleCreate@12 = MesDecodeBufferHandleCreate
_MesDecodeIncrementalHandleCreate@12 = MesDecodeIncrementalHandleCreate
_MesEncodeDynBufferHandleCreate@12 = MesEncodeDynBufferHandleCreate
_MesEncodeFixedBufferHandleCreate@16 = MesEncodeFixedBufferHandleCreate
_MesEncodeIncrementalHandleCreate@16 = MesEncodeIncrementalHandleCreate
_MesHandleFree@4 = MesHandleFree
_MesIncrementalHandleReset@24 = MesIncrementalHandleReset
_MesInqProcEncodingId@12 = MesInqProcEncodingId
_NDRCContextBinding@4 = NDRCContextBinding
_NDRCContextMarshall@8 = NDRCContextMarshall
_NDRCContextUnmarshall@16 = NDRCContextUnmarshall
_NDRSContextMarshall2@24 = NDRSContextMarshall2
_NDRSContextMarshall@12 = NDRSContextMarshall
_NDRSContextMarshallEx@16 = NDRSContextMarshallEx
_NDRSContextUnmarshall2@20 = NDRSContextUnmarshall2
_NDRSContextUnmarshall@8 = NDRSContextUnmarshall
_NDRSContextUnmarshallEx@12 = NDRSContextUnmarshallEx
_NDRcopy@12 = NDRcopy
_NdrAllocate@8 = NdrAllocate
_NdrAsyncClientCall = NdrAsyncClientCall
_NdrAsyncServerCall@4 = NdrAsyncServerCall
_NdrAsyncStubCall@16 = NdrAsyncStubCall
_NdrByteCountPointerBufferSize@12 = NdrByteCountPointerBufferSize
_NdrByteCountPointerFree@12 = NdrByteCountPointerFree
_NdrByteCountPointerMarshall@12 = NdrByteCountPointerMarshall
_NdrByteCountPointerUnmarshall@16 = NdrByteCountPointerUnmarshall
_NdrCStdStubBuffer2_Release@8 = NdrCStdStubBuffer2_Release
_NdrCStdStubBuffer_Release@8 = NdrCStdStubBuffer_Release
_NdrClearOutParameters@12 = NdrClearOutParameters
_NdrClientCall = NdrClientCall
_NdrClientCall2 = NdrClientCall2
_NdrClientContextMarshall@12 = NdrClientContextMarshall
_NdrClientContextUnmarshall@12 = NdrClientContextUnmarshall
_NdrClientInitialize@16 = NdrClientInitialize
_NdrClientInitializeNew@16 = NdrClientInitializeNew
_NdrComplexArrayBufferSize@12 = NdrComplexArrayBufferSize
_NdrComplexArrayFree@12 = NdrComplexArrayFree
_NdrComplexArrayMarshall@12 = NdrComplexArrayMarshall
_NdrComplexArrayMemorySize@8 = NdrComplexArrayMemorySize
_NdrComplexArrayUnmarshall@16 = NdrComplexArrayUnmarshall
_NdrComplexStructBufferSize@12 = NdrComplexStructBufferSize
_NdrComplexStructFree@12 = NdrComplexStructFree
_NdrComplexStructMarshall@12 = NdrComplexStructMarshall
_NdrComplexStructMemorySize@8 = NdrComplexStructMemorySize
_NdrComplexStructUnmarshall@16 = NdrComplexStructUnmarshall
_NdrConformantArrayBufferSize@12 = NdrConformantArrayBufferSize
_NdrConformantArrayFree@12 = NdrConformantArrayFree
_NdrConformantArrayMarshall@12 = NdrConformantArrayMarshall
_NdrConformantArrayMemorySize@8 = NdrConformantArrayMemorySize
_NdrConformantArrayUnmarshall@16 = NdrConformantArrayUnmarshall
_NdrConformantStringBufferSize@12 = NdrConformantStringBufferSize
_NdrConformantStringMarshall@12 = NdrConformantStringMarshall
_NdrConformantStringMemorySize@8 = NdrConformantStringMemorySize
_NdrConformantStringUnmarshall@16 = NdrConformantStringUnmarshall
_NdrConformantStructBufferSize@12 = NdrConformantStructBufferSize
_NdrConformantStructFree@12 = NdrConformantStructFree
_NdrConformantStructMarshall@12 = NdrConformantStructMarshall
_NdrConformantStructMemorySize@8 = NdrConformantStructMemorySize
_NdrConformantStructUnmarshall@16 = NdrConformantStructUnmarshall
_NdrConformantVaryingArrayBufferSize@12 = NdrConformantVaryingArrayBufferSize
_NdrConformantVaryingArrayFree@12 = NdrConformantVaryingArrayFree
_NdrConformantVaryingArrayMarshall@12 = NdrConformantVaryingArrayMarshall
_NdrConformantVaryingArrayMemorySize@8 = NdrConformantVaryingArrayMemorySize
_NdrConformantVaryingArrayUnmarshall@16 = NdrConformantVaryingArrayUnmarshall
_NdrConformantVaryingStructBufferSize@12 = NdrConformantVaryingStructBufferSize
_NdrConformantVaryingStructFree@12 = NdrConformantVaryingStructFree
_NdrConformantVaryingStructMarshall@12 = NdrConformantVaryingStructMarshall
_NdrConformantVaryingStructMemorySize@8 = NdrConformantVaryingStructMemorySize
_NdrConformantVaryingStructUnmarshall@16 = NdrConformantVaryingStructUnmarshall
_NdrContextHandleInitialize@8 = NdrContextHandleInitialize
_NdrContextHandleSize@12 = NdrContextHandleSize
_NdrConvert2@12 = NdrConvert2
_NdrConvert@8 = NdrConvert
_NdrCorrelationFree@4 = NdrCorrelationFree
_NdrCorrelationInitialize@16 = NdrCorrelationInitialize
_NdrCorrelationPass@4 = NdrCorrelationPass
_NdrDcomAsyncClientCall = NdrDcomAsyncClientCall
_NdrDcomAsyncStubCall@16 = NdrDcomAsyncStubCall
_NdrDllCanUnloadNow@4 = NdrDllCanUnloadNow
_NdrDllGetClassObject@24 = NdrDllGetClassObject
_NdrDllRegisterProxy@12 = NdrDllRegisterProxy
_NdrDllUnregisterProxy@12 = NdrDllUnregisterProxy
_NdrEncapsulatedUnionBufferSize@12 = NdrEncapsulatedUnionBufferSize
_NdrEncapsulatedUnionFree@12 = NdrEncapsulatedUnionFree
_NdrEncapsulatedUnionMarshall@12 = NdrEncapsulatedUnionMarshall
_NdrEncapsulatedUnionMemorySize@8 = NdrEncapsulatedUnionMemorySize
_NdrEncapsulatedUnionUnmarshall@16 = NdrEncapsulatedUnionUnmarshall
_NdrFixedArrayBufferSize@12 = NdrFixedArrayBufferSize
_NdrFixedArrayFree@12 = NdrFixedArrayFree
_NdrFixedArrayMarshall@12 = NdrFixedArrayMarshall
_NdrFixedArrayMemorySize@8 = NdrFixedArrayMemorySize
_NdrFixedArrayUnmarshall@16 = NdrFixedArrayUnmarshall
_NdrFreeBuffer@4 = NdrFreeBuffer
_NdrFullPointerFree@8 = NdrFullPointerFree
_NdrFullPointerInsertRefId@12 = NdrFullPointerInsertRefId
_NdrFullPointerQueryPointer@16 = NdrFullPointerQueryPointer
_NdrFullPointerQueryRefId@16 = NdrFullPointerQueryRefId
_NdrFullPointerXlatFree@4 = NdrFullPointerXlatFree
_NdrFullPointerXlatInit@8 = NdrFullPointerXlatInit
_NdrGetBuffer@12 = NdrGetBuffer
_NdrGetDcomProtocolVersion@8 = NdrGetDcomProtocolVersion
_NdrGetPartialBuffer@4 = NdrGetPartialBuffer
_NdrGetPipeBuffer@12 = NdrGetPipeBuffer
_NdrGetUserMarshalInfo@12 = NdrGetUserMarshalInfo
_NdrHardStructBufferSize@12 = NdrHardStructBufferSize
_NdrHardStructFree@12 = NdrHardStructFree
_NdrHardStructMarshall@12 = NdrHardStructMarshall
_NdrHardStructMemorySize@8 = NdrHardStructMemorySize
_NdrHardStructUnmarshall@16 = NdrHardStructUnmarshall
_NdrInterfacePointerBufferSize@12 = NdrInterfacePointerBufferSize
_NdrInterfacePointerFree@12 = NdrInterfacePointerFree
_NdrInterfacePointerMarshall@12 = NdrInterfacePointerMarshall
_NdrInterfacePointerMemorySize@8 = NdrInterfacePointerMemorySize
_NdrInterfacePointerUnmarshall@16 = NdrInterfacePointerUnmarshall
_NdrIsAppDoneWithPipes@4 = NdrIsAppDoneWithPipes
_NdrMapCommAndFaultStatus@16 = NdrMapCommAndFaultStatus
_NdrMarkNextActivePipe@4 = NdrMarkNextActivePipe
_NdrMesProcEncodeDecode = NdrMesProcEncodeDecode
_NdrMesProcEncodeDecode2 = NdrMesProcEncodeDecode2
_NdrMesSimpleTypeAlignSize@4 = NdrMesSimpleTypeAlignSize
_NdrMesSimpleTypeDecode@12 = NdrMesSimpleTypeDecode
_NdrMesSimpleTypeEncode@16 = NdrMesSimpleTypeEncode
_NdrMesTypeAlignSize2@20 = NdrMesTypeAlignSize2
_NdrMesTypeAlignSize@16 = NdrMesTypeAlignSize
_NdrMesTypeDecode2@20 = NdrMesTypeDecode2
_NdrMesTypeDecode@16 = NdrMesTypeDecode
_NdrMesTypeEncode2@20 = NdrMesTypeEncode2
_NdrMesTypeEncode@16 = NdrMesTypeEncode
_NdrMesTypeFree2@20 = NdrMesTypeFree2
_NdrNonConformantStringBufferSize@12 = NdrNonConformantStringBufferSize
_NdrNonConformantStringMarshall@12 = NdrNonConformantStringMarshall
_NdrNonConformantStringMemorySize@8 = NdrNonConformantStringMemorySize
_NdrNonConformantStringUnmarshall@16 = NdrNonConformantStringUnmarshall
_NdrNonEncapsulatedUnionBufferSize@12 = NdrNonEncapsulatedUnionBufferSize
_NdrNonEncapsulatedUnionFree@12 = NdrNonEncapsulatedUnionFree
_NdrNonEncapsulatedUnionMarshall@12 = NdrNonEncapsulatedUnionMarshall
_NdrNonEncapsulatedUnionMemorySize@8 = NdrNonEncapsulatedUnionMemorySize
_NdrNonEncapsulatedUnionUnmarshall@16 = NdrNonEncapsulatedUnionUnmarshall
_NdrNsGetBuffer@12 = NdrNsGetBuffer
_NdrNsSendReceive@12 = NdrNsSendReceive
_NdrOleAllocate@4 = NdrOleAllocate
_NdrOleFree@4 = NdrOleFree
_NdrPipePull@16 = NdrPipePull
_NdrPipePush@12 = NdrPipePush
_NdrPipeSendReceive@8 = NdrPipeSendReceive
_NdrPipesDone@4 = NdrPipesDone
_NdrPipesInitialize@24 = NdrPipesInitialize
_NdrPointerBufferSize@12 = NdrPointerBufferSize
_NdrPointerFree@12 = NdrPointerFree
_NdrPointerMarshall@12 = NdrPointerMarshall
_NdrPointerMemorySize@8 = NdrPointerMemorySize
_NdrPointerUnmarshall@16 = NdrPointerUnmarshall
_NdrProxyErrorHandler@4 = NdrProxyErrorHandler
_NdrProxyFreeBuffer@8 = NdrProxyFreeBuffer
_NdrProxyGetBuffer@8 = NdrProxyGetBuffer
_NdrProxyInitialize@20 = NdrProxyInitialize
_NdrProxySendReceive@8 = NdrProxySendReceive
_NdrRangeUnmarshall@16 = NdrRangeUnmarshall
_NdrRpcSmClientAllocate@4 = NdrRpcSmClientAllocate
_NdrRpcSmClientFree@4 = NdrRpcSmClientFree
_NdrRpcSmSetClientToOsf@4 = NdrRpcSmSetClientToOsf
_NdrRpcSsDefaultAllocate@4 = NdrRpcSsDefaultAllocate
_NdrRpcSsDefaultFree@4 = NdrRpcSsDefaultFree
_NdrRpcSsDisableAllocate@4 = NdrRpcSsDisableAllocate
_NdrRpcSsEnableAllocate@4 = NdrRpcSsEnableAllocate
_NdrSendReceive@8 = NdrSendReceive
_NdrServerCall2@4 = NdrServerCall2
_NdrServerCall@4 = NdrServerCall
_NdrServerContextMarshall@12 = NdrServerContextMarshall
_NdrServerContextNewMarshall@16 = NdrServerContextNewMarshall
_NdrServerContextNewUnmarshall@8 = NdrServerContextNewUnmarshall
_NdrServerContextUnmarshall@4 = NdrServerContextUnmarshall
_NdrServerInitialize@12 = NdrServerInitialize
_NdrServerInitializeMarshall@8 = NdrServerInitializeMarshall
_NdrServerInitializeNew@12 = NdrServerInitializeNew
_NdrServerInitializePartial@16 = NdrServerInitializePartial
_NdrServerInitializeUnmarshall@12 = NdrServerInitializeUnmarshall
_NdrServerMarshall@16 = NdrServerMarshall
_NdrServerUnmarshall@24 = NdrServerUnmarshall
_NdrSimpleStructBufferSize@12 = NdrSimpleStructBufferSize
_NdrSimpleStructFree@12 = NdrSimpleStructFree
_NdrSimpleStructMarshall@12 = NdrSimpleStructMarshall
_NdrSimpleStructMemorySize@8 = NdrSimpleStructMemorySize
_NdrSimpleStructUnmarshall@16 = NdrSimpleStructUnmarshall
_NdrSimpleTypeMarshall@12 = NdrSimpleTypeMarshall
_NdrSimpleTypeUnmarshall@12 = NdrSimpleTypeUnmarshall
_NdrStubCall2@16 = NdrStubCall2
_NdrStubCall@16 = NdrStubCall
_NdrStubForwardingFunction@16 = NdrStubForwardingFunction
_NdrStubGetBuffer@12 = NdrStubGetBuffer
_NdrStubInitialize@16 = NdrStubInitialize
_NdrStubInitializeMarshall@12 = NdrStubInitializeMarshall
_NdrUserMarshalBufferSize@12 = NdrUserMarshalBufferSize
_NdrUserMarshalFree@12 = NdrUserMarshalFree
_NdrUserMarshalMarshall@12 = NdrUserMarshalMarshall
_NdrUserMarshalMemorySize@8 = NdrUserMarshalMemorySize
_NdrUserMarshalSimpleTypeConvert@12 = NdrUserMarshalSimpleTypeConvert
_NdrUserMarshalUnmarshall@16 = NdrUserMarshalUnmarshall
_NdrVaryingArrayBufferSize@12 = NdrVaryingArrayBufferSize
_NdrVaryingArrayFree@12 = NdrVaryingArrayFree
_NdrVaryingArrayMarshall@12 = NdrVaryingArrayMarshall
_NdrVaryingArrayMemorySize@8 = NdrVaryingArrayMemorySize
_NdrVaryingArrayUnmarshall@16 = NdrVaryingArrayUnmarshall
_NdrXmitOrRepAsBufferSize@12 = NdrXmitOrRepAsBufferSize
_NdrXmitOrRepAsFree@12 = NdrXmitOrRepAsFree
_NdrXmitOrRepAsMarshall@12 = NdrXmitOrRepAsMarshall
_NdrXmitOrRepAsMemorySize@8 = NdrXmitOrRepAsMemorySize
_NdrXmitOrRepAsUnmarshall@16 = NdrXmitOrRepAsUnmarshall
_NdrpSetRpcSsDefaults@8 = NdrpSetRpcSsDefaults
_RpcAbortAsyncCall@8 = RpcAbortAsyncCall
_RpcAsyncAbortCall@8 = RpcAsyncAbortCall
_RpcAsyncCancelCall@8 = RpcAsyncCancelCall
_RpcAsyncCompleteCall@8 = RpcAsyncCompleteCall
_RpcAsyncGetCallStatus@4 = RpcAsyncGetCallStatus
_RpcAsyncInitializeHandle@8 = RpcAsyncInitializeHandle
_RpcAsyncRegisterInfo@4 = RpcAsyncRegisterInfo
_RpcBindingCopy@8 = RpcBindingCopy
_RpcBindingFree@4 = RpcBindingFree
_RpcBindingFromStringBindingA@8 = RpcBindingFromStringBindingA
_RpcBindingFromStringBindingW@8 = RpcBindingFromStringBindingW
_RpcBindingInqAuthClientA@24 = RpcBindingInqAuthClientA
_RpcBindingInqAuthClientExA@28 = RpcBindingInqAuthClientExA
_RpcBindingInqAuthClientExW@28 = RpcBindingInqAuthClientExW
_RpcBindingInqAuthClientW@24 = RpcBindingInqAuthClientW
_RpcBindingInqAuthInfoA@24 = RpcBindingInqAuthInfoA
_RpcBindingInqAuthInfoExA@32 = RpcBindingInqAuthInfoExA
_RpcBindingInqAuthInfoExW@32 = RpcBindingInqAuthInfoExW
_RpcBindingInqAuthInfoW@24 = RpcBindingInqAuthInfoW
_RpcBindingInqObject@8 = RpcBindingInqObject
_RpcBindingInqOption@12 = RpcBindingInqOption
_RpcBindingReset@4 = RpcBindingReset
_RpcBindingServerFromClient@8 = RpcBindingServerFromClient
_RpcBindingSetAuthInfoA@24 = RpcBindingSetAuthInfoA
_RpcBindingSetAuthInfoExA@28 = RpcBindingSetAuthInfoExA
_RpcBindingSetAuthInfoExW@28 = RpcBindingSetAuthInfoExW
_RpcBindingSetAuthInfoW@24 = RpcBindingSetAuthInfoW
_RpcBindingSetObject@8 = RpcBindingSetObject
_RpcBindingSetOption@12 = RpcBindingSetOption
_RpcBindingToStringBindingA@8 = RpcBindingToStringBindingA
_RpcBindingToStringBindingW@8 = RpcBindingToStringBindingW
_RpcBindingVectorFree@4 = RpcBindingVectorFree
_RpcCancelAsyncCall@8 = RpcCancelAsyncCall
_RpcCancelThread@4 = RpcCancelThread
_RpcCancelThreadEx@8 = RpcCancelThreadEx
_RpcCertGeneratePrincipalNameA@12 = RpcCertGeneratePrincipalNameA
_RpcCertGeneratePrincipalNameW@12 = RpcCertGeneratePrincipalNameW
_RpcCompleteAsyncCall@8 = RpcCompleteAsyncCall
_RpcEpRegisterA@16 = RpcEpRegisterA
_RpcEpRegisterNoReplaceA@16 = RpcEpRegisterNoReplaceA
_RpcEpRegisterNoReplaceW@16 = RpcEpRegisterNoReplaceW
_RpcEpRegisterW@16 = RpcEpRegisterW
_RpcEpResolveBinding@8 = RpcEpResolveBinding
_RpcEpUnregister@12 = RpcEpUnregister
_RpcGetAsyncCallStatus@4 = RpcGetAsyncCallStatus
_RpcIfIdVectorFree@4 = RpcIfIdVectorFree
_RpcIfInqId@8 = RpcIfInqId
_RpcImpersonateClient@4 = RpcImpersonateClient
_RpcInitializeAsyncHandle@8 = RpcInitializeAsyncHandle
_RpcMgmtBindingInqParameter@12 = RpcMgmtBindingInqParameter
_RpcMgmtBindingSetParameter@12 = RpcMgmtBindingSetParameter
_RpcMgmtEnableIdleCleanup@0 = RpcMgmtEnableIdleCleanup
_RpcMgmtEpEltInqBegin@24 = RpcMgmtEpEltInqBegin
_RpcMgmtEpEltInqDone@4 = RpcMgmtEpEltInqDone
_RpcMgmtEpEltInqNextA@20 = RpcMgmtEpEltInqNextA
_RpcMgmtEpEltInqNextW@20 = RpcMgmtEpEltInqNextW
_RpcMgmtEpUnregister@16 = RpcMgmtEpUnregister
_RpcMgmtInqComTimeout@8 = RpcMgmtInqComTimeout
_RpcMgmtInqDefaultProtectLevel@8 = RpcMgmtInqDefaultProtectLevel
_RpcMgmtInqIfIds@8 = RpcMgmtInqIfIds
_RpcMgmtInqParameter@8 = RpcMgmtInqParameter
_RpcMgmtInqServerPrincNameA@12 = RpcMgmtInqServerPrincNameA
_RpcMgmtInqServerPrincNameW@12 = RpcMgmtInqServerPrincNameW
_RpcMgmtInqStats@8 = RpcMgmtInqStats
_RpcMgmtIsServerListening@4 = RpcMgmtIsServerListening
_RpcMgmtSetAuthorizationFn@4 = RpcMgmtSetAuthorizationFn
_RpcMgmtSetCancelTimeout@4 = RpcMgmtSetCancelTimeout
_RpcMgmtSetComTimeout@8 = RpcMgmtSetComTimeout
_RpcMgmtSetParameter@8 = RpcMgmtSetParameter
_RpcMgmtSetServerStackSize@4 = RpcMgmtSetServerStackSize
_RpcMgmtStatsVectorFree@4 = RpcMgmtStatsVectorFree
_RpcMgmtStopServerListening@4 = RpcMgmtStopServerListening
_RpcMgmtWaitServerListen@0 = RpcMgmtWaitServerListen
_RpcNetworkInqProtseqsA@4 = RpcNetworkInqProtseqsA
_RpcNetworkInqProtseqsW@4 = RpcNetworkInqProtseqsW
_RpcNetworkIsProtseqValidA@4 = RpcNetworkIsProtseqValidA
_RpcNetworkIsProtseqValidW@4 = RpcNetworkIsProtseqValidW
_RpcNsBindingInqEntryNameA@12 = RpcNsBindingInqEntryNameA
_RpcNsBindingInqEntryNameW@12 = RpcNsBindingInqEntryNameW
_RpcObjectInqType@8 = RpcObjectInqType
_RpcObjectSetInqFn@4 = RpcObjectSetInqFn
_RpcObjectSetType@8 = RpcObjectSetType
_RpcProtseqVectorFreeA@4 = RpcProtseqVectorFreeA
_RpcProtseqVectorFreeW@4 = RpcProtseqVectorFreeW
_RpcRaiseException@4 = RpcRaiseException
_RpcRegisterAsyncInfo@4 = RpcRegisterAsyncInfo
_RpcRevertToSelf@0 = RpcRevertToSelf
_RpcRevertToSelfEx@4 = RpcRevertToSelfEx
_RpcServerInqBindings@4 = RpcServerInqBindings
_RpcServerInqDefaultPrincNameA@8 = RpcServerInqDefaultPrincNameA
_RpcServerInqDefaultPrincNameW@8 = RpcServerInqDefaultPrincNameW
_RpcServerInqIf@12 = RpcServerInqIf
_RpcServerListen@12 = RpcServerListen
_RpcServerRegisterAuthInfoA@16 = RpcServerRegisterAuthInfoA
_RpcServerRegisterAuthInfoW@16 = RpcServerRegisterAuthInfoW
_RpcServerRegisterIf2@28 = RpcServerRegisterIf2
_RpcServerRegisterIf@12 = RpcServerRegisterIf
_RpcServerRegisterIfEx@24 = RpcServerRegisterIfEx
_RpcServerTestCancel@4 = RpcServerTestCancel
_RpcServerUnregisterIf@12 = RpcServerUnregisterIf
_RpcServerUseAllProtseqs@8 = RpcServerUseAllProtseqs
_RpcServerUseAllProtseqsEx@12 = RpcServerUseAllProtseqsEx
_RpcServerUseAllProtseqsIf@12 = RpcServerUseAllProtseqsIf
_RpcServerUseAllProtseqsIfEx@16 = RpcServerUseAllProtseqsIfEx
_RpcServerUseProtseqA@12 = RpcServerUseProtseqA
_RpcServerUseProtseqEpA@16 = RpcServerUseProtseqEpA
_RpcServerUseProtseqEpExA@20 = RpcServerUseProtseqEpExA
_RpcServerUseProtseqEpExW@20 = RpcServerUseProtseqEpExW
_RpcServerUseProtseqEpW@16 = RpcServerUseProtseqEpW
_RpcServerUseProtseqExA@16 = RpcServerUseProtseqExA
_RpcServerUseProtseqExW@16 = RpcServerUseProtseqExW
_RpcServerUseProtseqIfA@16 = RpcServerUseProtseqIfA
_RpcServerUseProtseqIfExA@20 = RpcServerUseProtseqIfExA
_RpcServerUseProtseqIfExW@20 = RpcServerUseProtseqIfExW
_RpcServerUseProtseqIfW@16 = RpcServerUseProtseqIfW
_RpcServerUseProtseqW@12 = RpcServerUseProtseqW
_RpcServerYield@0 = RpcServerYield
_RpcSmAllocate@8 = RpcSmAllocate
_RpcSmClientFree@4 = RpcSmClientFree
_RpcSmDestroyClientContext@4 = RpcSmDestroyClientContext
_RpcSmDisableAllocate@0 = RpcSmDisableAllocate
_RpcSmEnableAllocate@0 = RpcSmEnableAllocate
_RpcSmFree@4 = RpcSmFree
_RpcSmGetThreadHandle@4 = RpcSmGetThreadHandle
_RpcSmSetClientAllocFree@8 = RpcSmSetClientAllocFree
_RpcSmSetThreadHandle@4 = RpcSmSetThreadHandle
_RpcSmSwapClientAllocFree@16 = RpcSmSwapClientAllocFree
_RpcSsAllocate@4 = RpcSsAllocate
_RpcSsDestroyClientContext@4 = RpcSsDestroyClientContext
_RpcSsDisableAllocate@0 = RpcSsDisableAllocate
_RpcSsDontSerializeContext@0 = RpcSsDontSerializeContext
_RpcSsEnableAllocate@0 = RpcSsEnableAllocate
_RpcSsFree@4 = RpcSsFree
_RpcSsGetContextBinding@8 = RpcSsGetContextBinding
_RpcSsGetThreadHandle@0 = RpcSsGetThreadHandle
_RpcSsSetClientAllocFree@8 = RpcSsSetClientAllocFree
_RpcSsSetThreadHandle@4 = RpcSsSetThreadHandle
_RpcSsSwapClientAllocFree@16 = RpcSsSwapClientAllocFree
_RpcStringBindingComposeA@24 = RpcStringBindingComposeA
_RpcStringBindingComposeW@24 = RpcStringBindingComposeW
_RpcStringBindingParseA@24 = RpcStringBindingParseA
_RpcStringBindingParseW@24 = RpcStringBindingParseW
_RpcStringFreeA@4 = RpcStringFreeA
_RpcStringFreeW@4 = RpcStringFreeW
_RpcTestCancel@0 = RpcTestCancel
_TowerConstruct@24 = TowerConstruct
_TowerExplode@24 = TowerExplode
_UuidCompare@12 = UuidCompare
_UuidCreate@4 = UuidCreate
_UuidCreateNil@4 = UuidCreateNil
_UuidCreateSequential@4 = UuidCreateSequential
_UuidEqual@12 = UuidEqual
_UuidFromStringA@8 = UuidFromStringA
_UuidFromStringW@8 = UuidFromStringW
_UuidHash@8 = UuidHash
_UuidIsNil@8 = UuidIsNil
_UuidToStringA@8 = UuidToStringA
_UuidToStringW@8 = UuidToStringW
_char_array_from_ndr@16 = char_array_from_ndr
_char_from_ndr@8 = char_from_ndr
_data_from_ndr@16 = data_from_ndr
_data_into_ndr@16 = data_into_ndr
_data_size_ndr@16 = data_size_ndr
_double_array_from_ndr@16 = double_array_from_ndr
_double_from_ndr@8 = double_from_ndr
_enum_from_ndr@8 = enum_from_ndr
_float_array_from_ndr@16 = float_array_from_ndr
_float_from_ndr@8 = float_from_ndr
_long_array_from_ndr@16 = long_array_from_ndr
_long_from_ndr@8 = long_from_ndr
_long_from_ndr_temp@12 = long_from_ndr_temp
_short_array_from_ndr@16 = short_array_from_ndr
_short_from_ndr@8 = short_from_ndr
_short_from_ndr_temp@12 = short_from_ndr_temp
_tree_into_ndr@16 = tree_into_ndr
_tree_peek_ndr@16 = tree_peek_ndr
_tree_size_ndr@16 = tree_size_ndr
